IP +50mm +100mm +150mm +200mm +250mm +300mm +350mm +400mm +450mm +500mm +550mm +600mm

-50mm -100mm

-150mm

-200mm

-250mm

-300mm

-350mm

-400mm -450mm

-500mm

-550mm

-600mm [1080,-270]

[-690,270]

R=20mm

R=30mm

R=45.5mm

R=60.5mm d=9.5mm

d=8.5mm d=12mm